1.5 2 2.5 3 x 10^5 0 10 20 30 40 50 Répartition pour la stratégie P

Pa 1.8 2 2.2 2.4 2.6 2.8 x 10^5 0 10 20 30 40 50 Répartition pour la stratégie m

Pa

-5 0 5 10 x 10^4 0 5 10 15 20 25 30 35 Comparaison des stratégies P et m

Pa(P)-Pa(m)

0 1 2 3 4 5 x 10^4 0

50

100

150

200 Comparaison stratégie P et flux maximal

M-Pa(P)